; Step3LT.def : Declares the module parameters for the DLL.

LIBRARY      "Step3LT"
DESCRIPTION  'Step3LT Windows Dynamic Link Library'

EXPORTS
  LIBRARYID    @1
  LIBRARYENTRY @2